From 9d40c0dcc70462d78d6347676927b05eed245a9a Mon Sep 17 00:00:00 2001
From: Justin Clark-Casey (justincc)
Date: Thu, 7 Apr 2011 23:16:36 +0100
Subject: Remove the SQLite legacy adaptor.  This is no longer needed now that
 the main adaptor works on Mac OS X.

The SQLite legacy adapator was also not at all well maintained, even worse than the mainline sqlite adapator.
---
 OpenSim/Data/SQLiteLegacy/Resources/001_UserAccount.sql | 17 -----------------
 1 file changed, 17 deletions(-)
 delete mode 100644 OpenSim/Data/SQLiteLegacy/Resources/001_UserAccount.sql

(limited to 'OpenSim/Data/SQLiteLegacy/Resources/001_UserAccount.sql')

diff --git a/OpenSim/Data/SQLiteLegacy/Resources/001_UserAccount.sql b/OpenSim/Data/SQLiteLegacy/Resources/001_UserAccount.sql
deleted file mode 100644
index c38d9a7..0000000
--- a/OpenSim/Data/SQLiteLegacy/Resources/001_UserAccount.sql
+++ /dev/null
@@ -1,17 +0,0 @@
-﻿BEGIN TRANSACTION;
-
--- useraccounts table
-CREATE TABLE UserAccounts (
-    PrincipalID CHAR(36)  primary key,
-    ScopeID CHAR(36) NOT NULL,
-    FirstName VARCHAR(64) NOT NULL,
-    LastName VARCHAR(64) NOT NULL,
-    Email VARCHAR(64),
-    ServiceURLs TEXT,
-    Created INT(11),
-    UserLevel integer NOT NULL DEFAULT 0,
-    UserFlags integer NOT NULL DEFAULT 0,
-    UserTitle varchar(64) NOT NULL DEFAULT ''
-);
-
-COMMIT;
\ No newline at end of file
-- 
cgit v1.1

