From 9d40c0dcc70462d78d6347676927b05eed245a9a Mon Sep 17 00:00:00 2001
From: Justin Clark-Casey (justincc)
Date: Thu, 7 Apr 2011 23:16:36 +0100
Subject: Remove the SQLite legacy adaptor.  This is no longer needed now that
 the main adaptor works on Mac OS X.

The SQLite legacy adapator was also not at all well maintained, even worse than the mainline sqlite adapator.
---
 OpenSim/Data/SQLiteLegacy/Resources/001_AuthStore.sql | 18 ------------------
 1 file changed, 18 deletions(-)
 delete mode 100644 OpenSim/Data/SQLiteLegacy/Resources/001_AuthStore.sql

(limited to 'OpenSim/Data/SQLiteLegacy/Resources/001_AuthStore.sql')

diff --git a/OpenSim/Data/SQLiteLegacy/Resources/001_AuthStore.sql b/OpenSim/Data/SQLiteLegacy/Resources/001_AuthStore.sql
deleted file mode 100644
index 468567d..0000000
--- a/OpenSim/Data/SQLiteLegacy/Resources/001_AuthStore.sql
+++ /dev/null
@@ -1,18 +0,0 @@
-BEGIN TRANSACTION;
-
-CREATE TABLE auth (
-  UUID char(36) NOT NULL,
-  passwordHash char(32) NOT NULL default '',
-  passwordSalt char(32) NOT NULL default '',
-  webLoginKey varchar(255) NOT NULL default '',
-  accountType VARCHAR(32) NOT NULL DEFAULT 'UserAccount',
-  PRIMARY KEY  (`UUID`)
-);
-
-CREATE TABLE tokens (
-  UUID char(36) NOT NULL,
-  token varchar(255) NOT NULL,
-  validity datetime NOT NULL
-);
-
-COMMIT;
-- 
cgit v1.1

